Physiologically Based Pharmacokinetic Model of Methyl tertiary Butyl Ether and tertiary Butyl Alcohol Dosimetry in Male Rats Based on Binding to α2u-Globulin
author: Dr. Teresa Leavens PhD teresa_leavens@ncsu.edu North Carolina State University Population Health and Pathobiology [919-513-6446] [919-513-6358] College of Veterinary Medicine 4700 Hillsborough St Rale; Dr. Susan J. Borghoff PhD sborghoff@ils-inc.com [imported for project id 505 on Sep 16, 2002, no letter sent] Integrated Laboratory Systems, Inc. Research Triangle Park North Carolina United States
language: en

Abstract

Current physiologically based pharmacokinetic (PBPK) models for the fuel additive methyl tertiary butyl ether (MTBE) and its metabolite tertiary butyl alcohol (TBA) have not included a mechanism for chemical binding to the male-rat-specific protein α2u-globulin, which has been postulated to be responsible for renal effects in male rats observed in toxicity and carcinogenicity studies with MTBE. The objective of this work was to expand the previously published models for MTBE to include binding to α2u-globulin in the kidney of male rats. In the model, metabolism of MTBE was assumed to occur only in the liver via two saturable pathways. TBA metabolism was assumed to occur only in the liver via one saturable, low-affinity pathway and to be inducible following repeated exposures. The binding of MTBE and TBA to α2u-globulin was modeled as saturable and competitive and was assumed to only affect the rate of hydrolysis of α2u-globulin in the kidney. The developed model characterized the differences in kidney concentrations of MTBE and TBA in male versus female rats from inhalation exposures to MTBE, as well as the observed changes in blood and tissue concentrations from repeated exposure to TBA. The model-predicted binding affinity of MTBE to α2u-globulin was greater than TBA, and the hydrolysis rate of chemically bound α2u-globulin was approximately 30% of the unbound protein. This PBPK model supports the role of MTBE and TBA binding to the male-rat-specific protein α2u-globulin as essential for predicting concentrations of these chemicals in the kidney following exposure.