For publication Letter to Editor Comment on: Heterogeneity in meta-analysis should be expected and appropriately quantified by Higgins
author: Dr. Michael David Coory PhD m.coory@uq.edu.au Univertsity of Queensland School of Population Health [61 0409 578 577] [61 7 32341529] Public Helath Bldg Mayne Medical School Brisbane Queensland Austra
language: en

Abstract

not applicable (letter to editor)